CREATE User test with password 'test' createdb;
CREATE DATABASE test with owner = test  ENCODING = 'UTF8' LC_COLLATE = 'en_US.utf8' LC_CTYPE = 'en_US.utf8' TABLESPACE = pg_default CONNECTION LIMIT = -1;
