CREATE USER test11 WITH PASSWORD 'test' CREATEDB;
CREATE DATABASE test11 with owner = test11  ENCODING = 'UTF8' LC_COLLATE = 'en_US.utf8' LC_CTYPE = 'en_US.utf8' TABLESPACE = pg_default CONNECTION LIMIT = -1;
